AVS/Express Visualization Edition - Student Workbook 107

7 Appendix I

7.1 Obtaining hardcopy from AVS/Express

You can print the contents of the Viewer window by using the interactive tool - Print Editor .

• Alter the parameters to those shown above. • Click “Create Print File”. This will create a postscript file called/tmp/express.ps. • Go to a shell window and execute the appropriate system command to create the postscript file.

Appendix I

108 International AVS Centre - Manchester

7.2 Customising AVS/Express

You can include a number of command line options when you enter the AVS/Express start-up command “vxp”. Below is a list of a few of the available command line options which you may find useful:

• The-version option indicates which version of AVS/Express is installed. Does not start AVS/Express. • The-usage option lists all the possible options. Print a summary of command line options. does not start AVS/Express.

• The filename option loads a specified V file into the Applications object. You can use this filename command option to start an application created with AVS/Express and saved with the Save application command. By default neither the Network Editor nor the VCP appear but this can be altered using the following commands, • -ne: requests the network editor • -none: suppresses the network editor • -vcp: requests the VCP • -novcp: suppresses the VCP

Appendix I

AVS/Express Visualization Edition - Student Workbook 109

7.3 Journaling in AVS/Express

Journaling lets you record a set of operations you perform on an object and replay them. AVS/Express records these operations as V statements and commands on a journal file. To record a series of Network Editor operations:

• From theJournal menu on the Network Editor menu bar select the Record pull-down command. The Record File dialogue box will appear.

• Specify a journal filename. • SelectOK to begin recording. Perform the series of operations, e.g. build a network, set values and manipulate the object. (Any actions performed outside the workspace will be ignored).

• To stop recording select theStop pull-down command from the Journal menu. The recording will stop and the resulting V file will be saved.

To play back the V file:

• Make sure that you are no longer recording and that your network is in the same state it was in when you began recording.

• Select thePlayback pull-down command from The Journal menu. The Playback File dialogue box will appear.

• Select the journal file and clickOK. The recording will be executed and cannot be stopped part way through.

Appendix I

110 International AVS Centre - Manchester